% TODO: Not great Looking... 
\begin{tabular}{@{}p{0.25\textwidth}ccc@{}}
\toprule
\thead{Oven type}  & \thead{Plain (no tools)} & \thead{Inverted tray} & \thead{Dutch oven} \\ \midrule
Gas                & No                       & No                    & Yes                 \\ 
Convection (Fan always on) & No               & No                    & Yes                 \\ 
Convection (Fan can be disabled) & No         & Yes                   & Yes                 \\ 
Steam              & Yes                      & Yes                   & Yes                 \\
\bottomrule
\end{tabular}
